)c (GeV/ Tp 0.4 1 2 3 4 5 6 7 8 910

fit Theory, Data

1

2

3 ALICE 0π Tp = 0.5 μ NLO Tp = μ NLO Tp = 2 μ NLO Pythia 8, Tune 4C

= 2.76 TeV s pp